(deg)

wrap ϕ -20 -10 0 10 20

Rate (GHz)/0.402deg

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 2.2 2.4 Open Transition Closed

Detector Plane Phi-Wrap Distribution