r (m)

0.6 0.7 0.8 0.9 1 1.1 1.2 1.3

Rate (GHz/5mm)

-3 10

-2 10

-1 10

1

10

210 Moller Elastic ep Inelastic ep

Detector Plane Radial Distributions